dSelect Device
 
This menu displays all currently available devices. If you wish
to create a new device, press "A". If you wish to edit a device,
select the device and press "E". If you wish to delete a device,
select the device and press "D". Press Escape to exit.
 
eType
 
This option allows you to select/change the device type.
 
fPicture File
 
This option allows you to select/change the device picture file.
The picture file is a PCX Paintbrush image file. If you like,
you can load one of the given picture files into your paint
program and move the buttons/displays to more desired locations.
 
gButton On Color
 
This option allows you to change the button on color. This is the
color value used to indicate that a button is on. This value must
be in the range of 0 to 255. To determine which color values
yield which colors, select "Show Color Table" option.
 
hButton Off Color
 
This option allows you to change the button off color. This is the
color value used to indicate that a button is off. This value must
be in the range of 0 to 255. To determine which color values
yield which colors, select "Show Color Table" option.
 
iButton N/A Color
 
This option allows you to change the button N/A color. This is the
color value used to indicate that a button is N/A. This value must
be in the range of 0 to 255. To determine which color values
yield which colors, select "Show Color Table" option.
 
NOTE: Only applicable to the Compact Disc device.
 
jFont Color
 
This option allows you to change the font color. This is the color
value used to display the digital number displays. This value must
be in the range of 0 to 255. To determine which color values
yield which colors, select "Show Color Table" option.
 
kBackground Color
 
This option allows you to change the background color. This is the
color value used to display the background of either the Peak or
Spectrum Analyzer realtime displays. This value must be in the
range of 0 to 255. To determine which color values yield which
colors, select "Show Color Table" option.
 
NOTE: Only applicable to the Peak and Spectrum Analyzer devices.
 
lDescription
 
This option allows you to change or give the device a descriptive
name of up to 30 characters. This name is only used for your
reference.
 
mAdd Device
 
Please enter the name of the new device you wish to create. Do
not enter an extension. The extension ".DEV" will be given.
 
nShow Color Table
 
This option displays a color table which may be used to determine
which values yield which colors. These color values are then
specified for "Button On Color", "Button Off Color", "Button N/A
Color", "Font Color", and "Background Color" options.
 

 